SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";

--
-- Base de données: `sikevadb-kiwa`
--
CREATE DATABASE IF NOT EXISTS `sikevadb-test` DEFAULT CHARACTER SET utf8 COLLATE utf8_unicode_ci;
USE `sikevadb-kiwa`;

-- --------------------------------------------------------

--
-- Structure de la table `elements`
--

DROP TABLE IF EXISTS `elements`;
CREATE TABLE IF NOT EXISTS `elements` (
  `TOPKEY` varchar(255) COLLATE utf8_unicode_ci NOT NULL,
  `SUBKEY` varchar(255) COLLATE utf8_unicode_ci DEFAULT NULL,
  `SIZE` int(11) NOT NULL DEFAULT '0',
  `DIGEST` varchar(255) COLLATE utf8_unicode_ci NOT NULL,
  `CREATION_DATE` date NOT NULL,
  `EDITION_DATE` date NOT NULL,
  `ARCHIVE_DATE` date DEFAULT NULL,
  `VALUE` longtext COLLATE utf8_unicode_ci,
  PRIMARY KEY (`TOPKEY`),
  KEY `XKEYINDEX` (`TOPKEY`,`SUBKEY`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;
